Scale chr12:

RefSeq Curated Ribo-seq SmProt ATG Ribo-seq SmProt nonATG literature SmProt database SmProt MS SmProt NONCODE RepeatMasker

5 kb mm10 56,700,000 56,705,000 56,710,000 RefSeq gene predictions from NCBI SmProt genes with ATG startcodon from Ribosome Profiling SmProt genes with non-ATG startcodon from Ribosome Profiling SmProt genes from literature mining SmProt genes from other databases SmProt genes from mass spectrum non-coding RNAs Repeating Elements by RepeatMasker